/GeV 0πm 0 0.2 0.4 0.6

Events

0 100 200 300 400 500 LDCPrime GLD GLDPrime GLD4LDC

ECAL) 2 5mm × = 1.73m, 5 TPC (R

ECAL) 2 10mm × = 1.98m, 10 TPC (R

ECAL) 2 10mm × = 1.74m, 10 TPC (R

ECAL) 2 10mm × = 1.54m, 10 TPC (R